%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\section{Discussion \& Conclusion}

\begin{frame}
	\frametitle{Discussion \& Conclusion}

	\begin{itemize}
		\item Own simulations
		      \begin{itemize}
			      \item Better results to be expected (technology with higher $f_\text{t}$, $f_\text{max}$, stability not considered)
			      \item Maybe better results by using current mirrors to set operating points of buffer instead of resistors
		      \end{itemize}
		      \bigskip
		\item General structure
		      \begin{itemize}
			      \item Removal of $g_\text{m}$ stage of Gilbert cell $\rightarrow$ more voltage headroom
			      \item High bandwidth TIA and inductive peaking $\rightarrow$ high bandwidth
			      \item Differential to single-ended conversion $\rightarrow$ dense chip-to-package transition
		      \end{itemize}
		      \bigskip
		\item Applications of this design
		      \begin{itemize}
			      \item SiGe HBT technology integrable with CMOS $\rightarrow$ scalable, suitable for mixed-signal ICs
			      \item Ideal for electronic beam stearing in mm-Wave applications (because of small size, moderate noise figure)
		      \end{itemize}
	\end{itemize}
\end{frame}
