\begin{center}
 \includegraphics[width=25mm,valign=c]{cel-thesis/logos/cc-by-nc}
\end{center}

\vspace{1cm}
This work is licensed under the Creative Commons Attribution-NonCommercial 4.0 International License. To view a copy of this license, visit http://creativecommons.org/licenses/by-nc/4.0/.

\newpage
